-30-25-20-15-10-50

-5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8

km from Buoy 8

Gradient Richardson Number

Depth [m]

0.00.10.20.30.40.50.60.70.80.91.0

-30-25-20-15-10-50

-5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8

Salinity [psu]

Depth [m]

3691215182124273033

-30-25-20-15-10-50

-5 -4 -3 -2 -1 0 1 2 3 4 5 6 7 8

1993 Oct 18 1034-1255 PST, Peak Flood Along Channel Velocity [m/s]

Depth [m]

-1.8-1.5-1.2-0.9-0.6-0.30.00.30.60.91.21.51.8